USE `app_uoj233`;
insert into judger_info (judger_name, password, ip, display_name, description) values ('remote_judger', '_judger_password_', 'uoj-remote-judger', '远端评测机', '用于桥接远端 OJ 评测机的虚拟评测机。');
